[GeV] H m 250 300 350 400 450 500 hh) (pb) → BR(H ×H) → (gg σ 95% C.L. limits

0 5 10 15 20 25 combined observed

combined expected

expected σ 1±

expected σ 2±

ATLAS internal -1 L dt = 20.3 fb ∫